# MBROWSE.MUP
# -----------
#
# This script is not required for users of Gemini 1.99 (or Gemini 2.0).  It
# is only required for users of older (<= 1.2) versions of Gemini.
#
# If you are using an old version of the Gemini replacement desktop, you
# need this script.  There is a conflict between Heat & Serve C and Gemini
# that will cause a system crash if no paramaters are passed to MasterBrowse
# on the command line.  This script, once installed, will be completely
# transparent to the user.
#
# To install it, you must first change the pathname below so that the script
# knows where MBROWSE.PRG is located on your system.  Install MBROWSE.MUP
# as an application, making sure that you select "close all windows on
# startup" and "it is a GEM application".
# 
# You can treat MBROWSE.MUP like any other program (application, desktop
# icon, drag files directly to it, and more).
#
f:\m_browse.44\mbrowse.prg -gemini $*

